(GeV/ Tp 1−10 1 10

+1R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 5-10% 10-15% 15-20% 20-25% 25-30% 30-35% 35-40% 40-45% 45-50% 50-55% 55-60% 60-65% 65-70% 70-75% 75-80% 80-85% 85-90% 90-95% 95-100%

= 5.02 TeV NNs ALICE, Pb-Pb, | < 0.8 η charged particles, |